\documentclass[10pt]{article}

\usepackage{fullpage}
\usepackage{setspace}
\usepackage{parskip}
\usepackage{titlesec}
\usepackage[section]{placeins}
\usepackage{xcolor}
\usepackage{breakcites}
\usepackage{lineno}
\usepackage{hyphenat}





\PassOptionsToPackage{hyphens}{url}
\usepackage[colorlinks = true,
            linkcolor = blue,
            urlcolor  = blue,
            citecolor = blue,
            anchorcolor = blue]{hyperref}
\usepackage{etoolbox}
\makeatletter
\patchcmd\@combinedblfloats{\box\@outputbox}{\unvbox\@outputbox}{}{%
  \errmessage{\noexpand\@combinedblfloats could not be patched}%
}%
\makeatother


\usepackage{natbib}




\renewenvironment{abstract}
  {{\bfseries\noindent{\abstractname}\par\nobreak}\footnotesize}
  {\bigskip}

\titlespacing{\section}{0pt}{*3}{*1}
\titlespacing{\subsection}{0pt}{*2}{*0.5}
\titlespacing{\subsubsection}{0pt}{*1.5}{0pt}


\usepackage{authblk}


\usepackage{graphicx}
\usepackage[space]{grffile}
\usepackage{latexsym}
\usepackage{textcomp}
\usepackage{longtable}
\usepackage{tabulary}
\usepackage{booktabs,array,multirow}
\usepackage{amsfonts,amsmath,amssymb}
\providecommand\citet{\cite}
\providecommand\citep{\cite}
\providecommand\citealt{\cite}
% You can conditionalize code for latexml or normal latex using this.
\newif\iflatexml\latexmlfalse
\providecommand{\tightlist}{\setlength{\itemsep}{0pt}\setlength{\parskip}{0pt}}%

\AtBeginDocument{\DeclareGraphicsExtensions{.pdf,.PDF,.eps,.EPS,.png,.PNG,.tif,.TIF,.jpg,.JPG,.jpeg,.JPEG}}

\usepackage[utf8]{inputenc}
\usepackage[english]{babel}



\usepackage{float}








\begin{document}

\title{Clinical Magnet Application to Temporarily Inhibit Subcutaneous
Implantable Cardioverter Defibrillators Therapy in Emergency Situations:
One size fits all.}



\author[1]{Maurizio Santomauro}%
\author[2]{Mario Petretta}%
\author[2]{francesco cacciatore}%
\author[2]{carla riganti}%
\author[3]{andrea santomauro}%
\author[3]{Gaetano Castellano}%
\author[2]{Aniello Viggiano}%
\author[1]{gianluigi iovino}%
\author[4]{Antonio Rapacciuolo}%
\author[2]{Francesco Mafettone}%
\author[2]{Pasquale Abete}%
\affil[1]{Federico II University}%
\affil[2]{University of Naples Federico II}%
\affil[3]{University of Salerno}%
\affil[4]{Federico II University of Naples}%


\vspace{-1em}



  
  \date{June 18, 2024}


\begingroup
\let\center\flushleft
\let\endcenter\endflushleft
\maketitle
\endgroup





\selectlanguage{english}
\begin{abstract}
The subcutaneous implantable cardioverter defibrillatoruse has increased
worldwide. The annual rate of inappropriate shock (IAS) is between 3.1\%
and 25\% and is usually followed by admission in Critical Care units. In
such setting, the suspension of shock therapy is mandatory during an
electrical storm. Temporary inhibition is also requested during surgical
procedures but now is not yet clearly addressed by guidelines. Here we
describe the strategies that can be followed to reduce IAS in critical
care settings with the appropriate use of any model of clinical magnet,
to temporarily inhibit shock therapies.%
\end{abstract}%



\sloppy


\textbf{Hosted file}

\verb`Magnets_JCE_Fig.docx`  available at \url{https://authorea.com/users/727715/articles/709339-clinical-magnet-application-to-temporarily-inhibit-subcutaneous-implantable-cardioverter-defibrillators-therapy-in-emergency-situations-one-size-fits-all}

\selectlanguage{english}
\FloatBarrier
\end{document}

